
                SAVE Memory command.

        The SAVE Memory command reads an area of memory from your M68332EVS
and saves that data in a DOS file on your disk. The SAVE memory command
saves data in S-record format. It uses the S3-S7 format.

        Upon activation, this command asks for the starting, ending, and
execution address of the data you wish to save. S-Records are created for
the data beginning at the start address thru the ending address. The
execution address is written into tha address field of the final (S7) record.
The starting address must be word aligned, that is, it must be an "Even" number.
After receiving valid Hex-decimal addresses, this command prompts you for
the name of a DOS file into which the S-Record data is placed. This must be
a valid DOS filename. If no such file exists, it will be created. If it
already exists, it will be overwritten.

        Please note that the DOS file will be created (written) in the
directory described by the file COUGAR.CFG. The fourth entry in the COUGAR.CFG
file points to the Upload / Download directory.

%END
N.HLP
